The DMC colors are assigned by reading a .DMC file. The default $
file is Master.dmc. A different file can be used by selecting   $
the Load DMC file option on the file menu. Additional DMC files $
can be created by running RGB2DMC (available to registered      $
users). Master.dmc was create in an EGA monitor, and as such as $
only 64 colors. In general, it's not a very good match. The DMC $
colors and name can be changed by selecting VIEW SYMBOLS from   $
the VIEW menu. The symbols used in the image, and the assigned  $
DMC color and name will be displayed. Select DONE (ENTER) when  $
you are done. Select a symbol, and the dmc color number and name$
will appear in the boxes labeled DMC NAME & DMC NUMBER. At this $
point you can edit the name and number. Select SAVE to keep the $
changes, select CANCEL to cancel the changes. Select PRINT to   $
generate a copy of JUST the symbol table and DMC colors. The    $
can be a GIF of the list, or a hard copy.                       $
